)^2c

(GeV/ μμM 1.5 2 2.5 3 3.5 4 4.5

2c Counts / 50 MeV/

20 40 60 80 100 310 × 10-50% c <6 GeV/ Tp 2<

)^2c

(GeV/ μμM 1.5 2 2.5 3 3.5 4 4.5

Ratio

0.95 1 1.05